A1 Classic Elegance- socket EU gold color

Classic Design Standards

The A1 Series epitomizes classic European elegance, blending timeless design with modern functionality. Adhering to EU standards, this product ensures not only aesthetic appeal but also compliance with stringent quality regulations.

Certified Excellence

With CE certification, the A1 Series guarantees safety and reliability. The robust structure is built to pass EU testing, providing customers with confidence in their purchase. This commitment to quality enhances its enduring performance.

Customization and Competitive Pricing

Our product offers customizable colors to suit various preferences, ensuring that it fits seamlessly into any environment. With dimensions of 8686mm and options including a 10A current switch and a 16A socket rated at 250V, the A1 Series is not only competitively priced but also delivers stable performance and high quality.